         180           8
   5.12462136018132        4.64356378527317        4.30729706785124     
   3.96698490191220        3.66460329423870        3.42931311242770     
   3.18083048057160        3.02532312147225     
  -13.0141356867684       -13.2223700808006       -13.4522885753040     
  -13.6565220242007       -13.8472156602243       -14.0008624258785     
  -14.1612269341255       -14.3657412116612     
 -1.392795741776565E-004  0.000000000000000E+000
  0.988710089415817       0.000000000000000E+000
  0.991698577306559       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
