         180           3
   8.37614585560265        6.94808770145008        6.10528409362586     
   4.54831285921434        3.97269216694783        4.12395651190854     
 -1.266220740887496E-003  0.000000000000000E+000
   1.00202069495276       0.000000000000000E+000
  0.998956547646594       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
