         180           8
   5.17862341075304        4.76486451859355        4.37227691342068     
   4.00369184673066        3.65200730462220        3.35836208676101     
   3.08948257117010        2.79461229736171     
  -12.9429759172122       -13.2691338959666       -13.6122375361617     
  -13.9017099283753       -14.1733403559385       -14.4047230499193     
  -14.5319119168043       -14.6680317526194     
 -2.526682147166415E-004  0.000000000000000E+000
  0.989132435864736       0.000000000000000E+000
  0.992072654064221       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
