         180           8
   5.53999209068716        5.43220129590013        5.30497681106280     
   5.20188169606911        5.07486015915644        4.94627203571740     
   4.85354282546548        4.68914901808823     
  -12.8962980456486       -12.7472137057181       -12.4581537699599     
  -12.1106569062768       -11.7231315610702       -11.3080022700280     
  -10.9079227880320       -10.4415330243541     
 -2.603492510329709E-004  0.000000000000000E+000
  0.989297665733767       0.000000000000000E+000
  0.992302881571389       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
