         180           8
   6.10425713271184        5.90737080103445        5.75327659835983     
   5.58790717585475        5.43699172576390        5.32759605758176     
   5.25064164716317        5.09815118031913     
  -13.2863346965759       -13.1101277894212       -12.8133290709430     
  -12.4574955240385       -12.0677020835968       -11.6774033733377     
  -11.2896038881356       -10.8665417711196     
 -2.996402861426832E-004  0.000000000000000E+000
  0.989102243060629       0.000000000000000E+000
  0.992248473233245       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
