         180           8
   5.71487496447916        5.50550027375017        5.36706110041397     
   5.21157089026892        5.07560026887040        4.94773310144921     
   4.83658122992427        4.66842443231656     
  -13.0300425581854       -12.8396348435008       -12.5443291229853     
  -12.1572302065633       -11.7686030826533       -11.4089709082785     
  -11.0126474600625       -10.5857888918299     
 -3.665192862236383E-004  0.000000000000000E+000
  0.989374652501431       0.000000000000000E+000
  0.992368192372998       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
