         180           8
   8.77021654474394        8.05228590481361        7.43509343629776     
   6.79297295551091        6.20239319184867        5.66635051450671     
   5.09680811801307        4.50997131566534     
  -8.37436182692010       -8.59442045320883       -8.68971278659556     
  -8.86297094366516       -9.08021733447841       -9.30614319905376     
  -9.51409184619100       -9.81335832653016     
 -4.480539264242637E-004  0.000000000000000E+000
  0.989707635218113       0.000000000000000E+000
  0.992613410055532       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
