         180           8
   8.62653170665625        7.99364037223907        7.32699684578574     
   6.73884365167743        6.18748090731698        5.61312518862892     
   5.03586611744452        4.53477787631304     
  -8.49188382502617       -8.53594529203188       -8.65134924932627     
  -8.81790323807037       -9.00655624553359       -9.21454168665998     
  -9.49619717896861       -9.62681680830672     
 -4.619893551683740E-004  0.000000000000000E+000
  0.989607939871255       0.000000000000000E+000
  0.992467954711055       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
