         180           8
   8.67705043072338        8.04586093959039        7.36001514623435     
   6.75548823284684        6.19527128730968        5.60626664498163     
   5.04795128599103        4.49435465466125     
  -8.51728588930385       -8.68280461984308       -8.74686244484651     
  -8.88582809978915       -9.08560013617204       -9.31037666905688     
  -9.51886370636262       -9.81520805492629     
 -4.750542278079163E-004  0.000000000000000E+000
  0.989658065243832       0.000000000000000E+000
  0.992507507196395       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
