         180           3
   8.94394951373220        10.7100279896368        12.6440913519415     
   4.03145468464024        5.34173106564605        6.68381707367056     
 -1.195841530345924E-003  0.000000000000000E+000
   1.00216425127802       0.000000000000000E+000
  0.999019967747093       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
