         180           8
   4.15678264746492        3.68753519361639        3.37490954699568     
   3.04715774894796        2.70546576795042        2.36000223440377     
   2.03596077282621        1.89156613610819     
  -13.8462928637816       -14.0941862678979       -14.2854178573874     
  -14.5657375209797       -14.8365509106281       -15.0509329424929     
  -15.1867604667393       -15.7257637620918     
 -1.373730803303791E-004  0.000000000000000E+000
  0.987942205768816       0.000000000000000E+000
  0.990812178374036       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
