         180           8
   4.28150582518007        3.82987095211358        3.44555061725042     
   3.11340472682626        2.82399372912370        2.60886181681773     
   2.41740540242532        2.20928025524577     
  -14.2799306947958       -14.5033384087503       -14.8150957051539     
  -14.9800086181619       -15.1151566860232       -15.2889063118689     
  -15.4801030116391       -15.8297012645374     
 -2.899318830354227E-004  0.000000000000000E+000
  0.988165780419497       0.000000000000000E+000
  0.991016779774129       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
