         180           8
   4.28785631313265        3.85917757001251        3.47077673380810     
   3.11235897585046        2.73950752051774        2.45071638018057     
   2.24453118880826        2.02502873714613     
  -14.2663329764526       -14.5882162698877       -14.8829493857591     
  -15.1458213069837       -15.3767825340265       -15.6186138532564     
  -15.8779935432956       -16.0021337750230     
 -4.614363182007520E-004  0.000000000000000E+000
  0.988540693062563       0.000000000000000E+000
  0.991372454780609       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
