         180           8
   4.20950852826081        3.73756439675313        3.41750250603054     
   3.23313812180775        3.02012822684451        2.57621547400798     
   2.30983449268967        2.15214449992431     
  -13.9919535683209       -14.2131177030269       -14.5102357787405     
  -15.1784276059931       -15.7992009579847       -15.8481560238602     
  -16.0745078836183       -16.8054454504921     
 -6.098231254318990E-004  0.000000000000000E+000
  0.988838257758111       0.000000000000000E+000
  0.991621074496568       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
