         180           8
   7.81641236641198        7.17671054010451        6.55658630086792     
   5.99067093722741        5.38831317406309        4.77592844068275     
   4.20742229011662        3.64542264700939     
  -16.8642676038256       -16.7195883505957       -16.8194721292341     
  -16.9462870249565       -17.1471677540797       -17.4003544157095     
  -17.6737371836860       -17.9402118136983     
  2.288835486978410E-004  0.000000000000000E+000
  0.989626886947459       0.000000000000000E+000
  0.992664123702372       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
