         180           8
   8.15486498642095        7.50745173111374        6.86147694317359     
   6.19905061199320        5.55939128699641        4.94952543919687     
   4.32202371669593        3.88310181134254     
  -16.8780494020362       -16.8169780157629       -16.9284649851005     
  -17.0742702300848       -17.2820093448117       -17.5610211753853     
  -17.8772525774813       -18.2419310762449     
  1.204939153978792E-004  0.000000000000000E+000
  0.989895049604844       0.000000000000000E+000
  0.992813181576083       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
