         180           8
   8.08723064149776        7.30260251985493        6.69077557382061     
   6.07353668433937        5.48473538747502        4.89638839673247     
   4.36409378673422        3.83677615545102     
  -16.7271318703969       -16.8092297959493       -16.9063313321084     
  -17.1142279766627       -17.3622894944847       -17.6376309563463     
  -17.9318940825151       -18.2716569043627     
  3.455064719028578E-005  0.000000000000000E+000
  0.990073074894643       0.000000000000000E+000
  0.992927173712268       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
