         180           8
   4.09519365398057        3.58633538628936        3.07304603659751     
   2.57595441012744        2.04875438338917        1.65510121137823     
   1.30402949397126       0.800329899933580     
 -3.240063562334734E-002 -0.168420451521287      -0.227518513867380     
 -0.294491449778937      -0.333586794791525      -0.395180923349957     
 -0.506956711710710      -0.445331427075507     
 -9.102399217814086E-004  0.000000000000000E+000
   1.00297804899302       0.000000000000000E+000
  0.999999709198228       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
