         180           8
   8.26789053595889        7.52007386561461        6.90988019908826     
   6.26985459711511        5.61490483649570        5.03560804050130     
   4.45286001840238        3.92285452186899     
  -16.7873879947122       -16.8284941238150       -16.9945574807623     
  -17.2190606619233       -17.4158666386502       -17.6889488423196     
  -17.9809222346124       -18.3600183704549     
 -2.564374625119514E-005  0.000000000000000E+000
  0.990305514987553       0.000000000000000E+000
  0.993119319883115       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
