         180           8
   3.41573858870008        3.02282503690148        2.65540030714068     
   2.31542499270334        2.00624344028353        1.72483506961738     
   1.49164576474918        1.49078786054653     
  -21.2684377390034       -21.6126182800302       -21.9586261969905     
  -22.4016556995510       -22.7057797537786       -22.9457059803715     
  -23.2157961342357       -23.7518948568595     
 -3.480485905962566E-004  0.000000000000000E+000
  0.990403284680888       0.000000000000000E+000
  0.993463404324956       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
