         180           8
  -4.83823026848216       -5.20391544394488       -5.74525326758483     
  -6.14262619963734       -6.47316074640732       -6.78863894388972     
  -6.94502074807633       -7.03133298742841     
  -2.65866064176493       -2.82453338606592       -2.81387549849337     
  -2.83608929643302       -2.88191696895068       -2.87478722099972     
  -2.89555277741669       -3.05798922430878     
 -1.198169874172730E-003  0.000000000000000E+000
   1.00262759546955       0.000000000000000E+000
  0.999833760957827       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
