         180           8
   2.53191808924288        2.22962879614981        1.85383324554194     
   1.49950375468341        1.21421363733596        1.02883863104520     
  0.853338284958517       0.743419380551983     
  -21.3089758537197       -21.7036322075185       -21.8972552957493     
  -22.1182869746758       -22.3699667871297       -22.5810484512851     
  -22.7659399984585       -22.9730620925277     
 -1.238785610169245E-004  0.000000000000000E+000
  0.989637717405630       0.000000000000000E+000
  0.992914335208139       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
