         180           8
  -5.54438161267649       -5.71106152101760       -6.06992557511427     
  -6.41471379036494       -6.77017625845902       -7.10340724536314     
  -7.24243101731347       -7.38025372973594     
  -1.05453295079934       -1.24676448220489       -1.36473905800805     
  -1.35913258733323       -1.57351662453859       -2.63199989701354     
  -3.33845360575893       -3.05117336165364     
 -1.224778056404069E-003  0.000000000000000E+000
   1.00251145941483       0.000000000000000E+000
  0.999764177650270       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
