         180           8
   3.02579136325319        2.67474661223580        2.30350346432131     
   1.95342698080373        1.56374494498083        1.15835303915664     
  0.850035389977904       0.835245173816844     
  -19.8757168818666       -20.3024137404049       -20.7311500453385     
  -21.0458278654505       -21.3878382912824       -22.3660933108516     
  -23.2834375054792       -23.6309423439607     
 -5.911686682434216E-005  0.000000000000000E+000
  0.989686509378441       0.000000000000000E+000
  0.992890017080155       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
