         180           8
   3.00321736293183        2.79917440171459        2.64603050326417     
   2.49451119136586        2.35370150659514        2.21719928911884     
   2.10606886984956        1.95247487461163     
  -18.8540211390894       -18.7058229950085       -18.4036809173237     
  -18.0902749410506       -17.7236891720238       -17.4024235585681     
  -17.1346202337478       -16.6906762943385     
  2.172230471976482E-004  0.000000000000000E+000
  0.989426267449061       0.000000000000000E+000
  0.992450788971180       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
