         180           8
   1.83637249428642        1.56603841410557        1.37157836761235     
   1.23825396692846        1.07902483832896       0.928401668140042     
  0.812959371619244       0.663773602353163     
  -17.9932459001560       -17.8050060294962       -17.5256586361841     
  -17.1691543799801       -16.7998084791146       -16.4246584071211     
  -16.0379463934624       -15.7028641239757     
  4.076984436731408E-004  0.000000000000000E+000
  0.988923446052074       0.000000000000000E+000
  0.991956658457964       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
