         180           8
   1.35128910167435        1.16759953434650        1.05393996106734     
  0.899649714855254       0.733476141070665       0.586010722048906     
  0.476817083775770       0.179383906337976     
  -17.7489451683547       -17.5640147968122       -17.2634350864446     
  -16.9697344244629       -16.6090361539239       -16.2381566980324     
  -15.9056008243806       -15.5362229438849     
  3.496878503677507E-004  0.000000000000000E+000
  0.989082479980470       0.000000000000000E+000
  0.992117171154737       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
