         180           8
   1.70720554176520        1.46217746535994        1.29360932092071     
   1.16124263918196       0.976027234372918       0.799567417802926     
  0.686727482313935       0.550065797962576     
  -18.0164838795915       -17.7025272104691       -17.3476506757703     
  -16.9682395841911       -16.5667507352110       -16.1727606898458     
  -15.8151860669656       -15.4022312960887     
  3.300806294059295E-004  0.000000000000000E+000
  0.989237644929806       0.000000000000000E+000
  0.992196935728558       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
