         180           3
   8.27344564516949        6.23652926267364        3.92896491919510     
   5.24680073631978        5.05935365060829        4.82790878227680     
 -8.520931879967737E-004  0.000000000000000E+000
   1.00198974329736       0.000000000000000E+000
  0.999919005393362       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
