         180           8
   10.1108400108816        9.45982031289856        8.85229596462954     
   8.18577697982449        7.47087332565373        6.84889940546165     
   6.27048879012391        5.80269974049617     
  -14.5209773567641       -14.5548822467095       -14.6134966142871     
  -14.7169311142603       -14.8611035107715       -15.1186699049950     
  -15.3660218862190       -15.6036019381070     
  8.267436933673158E-004  0.000000000000000E+000
  0.989277242223312       0.000000000000000E+000
  0.992129559921803       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
