         180           8
   6.56752989182460        5.80747351384596        5.15456062146906     
   4.49811563267578        3.85284746768275        3.23954408515397     
   2.66580574313658        2.17620455795789     
  -13.4913444782031       -13.5219892003397       -13.6473282195281     
  -13.8698248555075       -14.0891022759010       -14.4138352114008     
  -14.7754186817599       -14.9921769148182     
  6.803097106181242E-004  0.000000000000000E+000
  0.989169815676464       0.000000000000000E+000
  0.991985305607245       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
