         180           8
   6.53013211318817        5.80573084929073        5.14941959509625     
   4.49517347641469        3.88394073023657        3.25442201784477     
   2.68810307897642        2.23752503897950     
  -13.5879314405818       -13.4573391215017       -13.5978983422145     
  -13.7942351545810       -14.0184944626705       -14.3541306654349     
  -14.6840675676797       -14.9247735505805     
  6.441105701690162E-004  0.000000000000000E+000
  0.989285697682305       0.000000000000000E+000
  0.992095767223905       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
