         180           8
   6.36620588600185        5.61471325069863        4.99524739326560     
   4.41869548974597        3.86101137773548        3.23371050263272     
   2.69767411703054        2.11523330138916     
  -13.0186359798142       -13.4278917217176       -13.9047832220626     
  -13.6996925713250       -13.8342940579280       -14.2534731524640     
  -14.5439533472417       -14.7271472941634     
  6.107590440784832E-004  0.000000000000000E+000
  0.989364777451606       0.000000000000000E+000
  0.992252985813363       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
