         180           3
   1.16532958877763      -0.500450415242468       -1.55859556574820     
   3.73867793002844        3.51194320417915        3.55507503401300     
 -1.076181201819616E-003  0.000000000000000E+000
   1.00219332396660       0.000000000000000E+000
  0.999291133664012       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
