         180           8
   2.79055905371085        2.41637819853744        2.06306188647466     
   1.73410095180895        1.45439955025131        1.19601724905751     
   1.04368245472145        1.02665288090897     
  -17.7649098640875       -18.2676078921310       -18.6110525742319     
  -18.9631550242488       -19.2885282153492       -19.5311959894159     
  -19.8490938811265       -20.3606433710464     
  9.298469096371152E-004  0.000000000000000E+000
  0.988643936294661       0.000000000000000E+000
  0.991650446684501       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
