         180           8
   3.23887361294960        2.85618785741034        2.51626356832320     
   2.18264203600748        1.84671154517167        1.51875597681026     
   1.33480304808104        1.35799789626514     
  -17.7952946188963       -18.1820917019008       -18.5124118987184     
  -18.8496782967089       -19.1640835737584       -19.4548595751008     
  -19.7177733455678       -20.3667531857079     
  8.376250587100385E-004  0.000000000000000E+000
  0.988719115250687       0.000000000000000E+000
  0.991747264242136       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
