         180           3
  0.297575559560604      -0.961024369303861       -1.81051637444096     
   3.68154494629092        3.59590053135372        3.65281314417490     
 -9.952026943465390E-004  0.000000000000000E+000
   1.00219637374253       0.000000000000000E+000
  0.999397103676426       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
