         180           8
   3.63858265834166        3.23169952600799        2.89335005215924     
   2.56346120061581        2.21153297142429        1.93590981261838     
   1.68881329857281        1.64025125448590     
  -18.0924324173971       -18.4308537237434       -18.7482012284959     
  -19.0552950195172       -19.2377199562985       -19.4514038544939     
  -19.6746838620825       -20.2716325305063     
  8.248305480596431E-004  0.000000000000000E+000
  0.988729966086922       0.000000000000000E+000
  0.991735411449191       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
