         180           8
   3.36217781915204        2.90680171594255        2.54458392526901     
   2.22534687833980        1.94764913199678        1.65769178424592     
   1.41223217371668        1.38804836966100     
  -18.3355565981327       -18.5748375274470       -18.6856901747955     
  -18.8715330938761       -19.1623938389591       -19.4186433882587     
  -19.6244011160534       -20.0955492838630     
  7.555886431876643E-004  0.000000000000000E+000
  0.988843051479851       0.000000000000000E+000
  0.991829030422159       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
