         180           8
   3.34360361453603        2.93537248383585        2.60381322959912     
   2.30458070665193        2.03467232435468        1.78720337756011     
   1.59446821496370        1.64583891735026     
  -17.9081634830525       -18.2480994837667       -18.6394294020280     
  -19.3151547267735       -19.9266089508343       -20.1479835895461     
  -20.3373406041555       -20.9560436336296     
  7.277041168778151E-004  0.000000000000000E+000
  0.989084436238738       0.000000000000000E+000
  0.992030326897343       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
