         180           8
   4.70578472243861        4.47963245406989        4.20577125790343     
   3.98917217070945        3.81275838213140        3.62680222198874     
   3.49405888105858        3.34527934117685     
  -18.2483829944237       -17.9734645537744       -17.6526623610602     
  -17.3441819241669       -16.9560410333243       -16.5812831433867     
  -16.1747820234077       -15.8176915450716     
  9.111914507646008E-004  0.000000000000000E+000
  0.988774410341440       0.000000000000000E+000
  0.991729582709989       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
