         180           8
   4.06690015848329        3.97830480180640        3.77632465593388     
   3.62573757473946        3.46243398442185        3.32700860517495     
   3.19301063402570        3.04534808771921     
  -18.2800721157073       -17.9649599880692       -17.5802486235487     
  -17.2294819845569       -16.8456854629313       -16.4201056740218     
  -15.9887853683568       -15.6409728856718     
  7.783682975209587E-004  0.000000000000000E+000
  0.989012657404535       0.000000000000000E+000
  0.991889565775250       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
