         180           3
  0.746776602567033        2.49963352264400        4.49336915095447     
   2.66059731143816        3.91755829836420        5.30052282455818     
 -9.852795141173743E-004  0.000000000000000E+000
   1.00241742478978       0.000000000000000E+000
  0.999646308184964       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
