         180           8
   3.97670852022413        3.89192249087219        3.68941846578320     
   3.51050176887339        3.40944147059992        3.27632244798408     
   3.11319848108505        2.86050506462010     
  -18.4896653604792       -18.3553123328390       -17.9785837034793     
  -17.6358873374527       -17.1473487418914       -16.6553484782666     
  -16.2422788470397       -15.7648190495500     
  5.604296169353807E-004  0.000000000000000E+000
  0.989405420706911       0.000000000000000E+000
  0.992208513589861       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
