         180           3
  0.249561192450842       -1.16976191751063       -2.56759547396221     
   4.29225727540970        4.29625376932793        4.01838144996797     
 -1.027410303478616E-003  0.000000000000000E+000
   1.00247780905986       0.000000000000000E+000
  0.999750932377358       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
