         180           3
  0.324685681301004       -1.69481213937521       -2.90718655361136     
   3.04147685299075        2.87185831421730        2.67984681480474     
 -6.775717642898156E-004  0.000000000000000E+000
   1.00246137393515       0.000000000000000E+000
  0.999711307171313       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
