         180           8
   6.80772912849425        6.40156637628554        6.11401588415043     
   5.85401182292601        5.50821781267579        5.20147192162913     
   4.97710949664521        4.92647120004239     
  -18.1881807716167       -18.5642180128928       -18.9827332194985     
  -19.4136744395194       -19.6251035845271       -19.8478595101876     
  -20.2155473474519       -20.6317229141076     
  7.550517561032624E-004  0.000000000000000E+000
  0.989165328356127       0.000000000000000E+000
  0.992223976057773       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
