         180           8
   3.28613134160013        2.89075996174625        2.57322549404777     
   2.22777834540400        1.91007660327905        1.68985131198944     
   1.56247310902460        1.64624149791925     
  -18.2098664621301       -18.4931088196722       -18.7422636916260     
  -19.0308314793260       -19.3192177025931       -19.5470559124394     
  -19.8693912646256       -20.2550872413236     
  5.538700485288185E-004  0.000000000000000E+000
  0.989210996532805       0.000000000000000E+000
  0.992181497922248       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
