         180
  6.203712664943044E-002  6.694703964285785E-003 -5.037398033530436E-002
 -0.103875775307061      -0.156235396900412      -0.214310418694168     
 -0.284716598006132      -0.351838045316723      -0.404673613763354     
 -0.478038304985821     
 -7.214938486613811E-003 -2.104111910059558E-002 -4.784204285136115E-002
 -9.441563751234960E-002 -0.140618768622756      -0.178038522493903     
 -0.216492326502335      -0.247498259433439      -0.269404174654136     
 -0.286284851049876     
  0.000000000000000E+000 -1.374344764099494E-002 -1.369947928243526E-002
 -1.383136437586134E-002 -1.384892103723409E-002 -1.389796011447334E-002
 -1.390955158332861E-002 -1.374188379210130E-002 -1.387787298403422E-002
 -1.378389993550988E-002 -1.393906060416694E-002 -1.396519190967471E-002
 -1.390382371208980E-002 -1.384694533872325E-002 -1.394564873677148E-002
 -1.375539142357462E-002 -1.399532745072020E-002 -1.406049811850723E-002
 -1.396417860610591E-002 -1.415026377511922E-002 -1.402278946476717E-002
 -1.376305294607404E-002 -1.486155574277837E-002  0.000000000000000E+000
 -1.422311476344894E-002 -1.399931761783296E-002 -1.427808983842444E-002
 -1.378419002546877E-002 -1.392836354326004E-002 -1.386898199695763E-002
 -1.411389073020751E-002 -1.400321105343117E-002 -1.379960911654170E-002
 -1.387222987368293E-002 -1.362836598403106E-002 -1.376823616728698E-002
 -1.355906381918204E-002 -1.392657997291713E-002 -1.387253977582728E-002
 -1.392314154948649E-002 -1.387970766807241E-002 -1.389059278813960E-002
 -1.389718346051152E-002 -1.386931790734847E-002 -1.372988017095490E-002
 -1.349390912504433E-002 -1.369154685554570E-002 -1.365024775295949E-002
 -1.390836580611052E-002 -1.400389744214309E-002 -1.366073623266467E-002
 -1.396098204427117E-002 -1.382062465505121E-002 -1.375797170453370E-002
 -1.384417076832187E-002 -1.399862320365802E-002 -1.355879652377672E-002
  0.000000000000000E+000  0.000000000000000E+000  0.000000000000000E+000
 -1.251934354183659E-002 -1.401931610177522E-002  0.000000000000000E+000
  0.000000000000000E+000 -1.387314422712968E-002 -1.391690264555427E-002
  0.000000000000000E+000 -1.327861611070827E-002 -1.363711132719722E-002
 -1.371553211006137E-002 -1.381501210153659E-002 -1.364073990359633E-002
 -1.403990816237353E-002 -1.386048855933178E-002 -1.386472293280712E-002
 -1.388161115725067E-002 -1.393156865740378E-002 -1.389273885757814E-002
 -1.393924684484787E-002 -1.387103349517297E-002 -1.381984582889851E-002
 -1.390825129918294E-002 -1.388029981855526E-002 -1.378890549358821E-002
 -1.389692010833221E-002 -1.384611821942513E-002 -1.386403863757963E-002
 -1.378999031387383E-002 -1.395250622527017E-002 -1.386775165936490E-002
 -1.374049394399572E-002 -1.390146356520660E-002 -1.381001537698418E-002
 -1.378232765045645E-002 -1.379473763708003E-002 -1.394783748335375E-002
 -1.391768203309736E-002 -1.393460142390563E-002 -1.376083936211306E-002
 -1.387751428393418E-002 -1.399682982359899E-002 -1.382003177021568E-002
 -1.384820879367839E-002 -1.395401735912453E-002 -1.385666695594762E-002
 -1.392133152961615E-002 -1.368052343232619E-002 -1.385965958520505E-002
 -1.376034348254359E-002 -1.399227447615911E-002 -1.379861333860962E-002
 -1.365183387396137E-002 -1.392124530179470E-002 -1.379690723058782E-002
 -1.392821648585947E-002 -1.357293350896514E-002 -1.394575295779555E-002
 -1.387685609074804E-002 -1.379647372764837E-002 -1.392430792676331E-002
 -1.378364565676681E-002 -1.390707462903212E-002 -1.383918100908473E-002
 -1.393284018062790E-002 -1.378315892885745E-002 -1.390332099132802E-002
 -1.373835880330128E-002 -1.375874801461559E-002 -1.397672966050539E-002
 -1.400856587670976E-002 -1.390292714451587E-002 -1.403429559699955E-002
 -1.372116086433969E-002 -1.383600302766346E-002 -1.391954326476976E-002
 -1.392510561079283E-002 -1.394972467862113E-002 -1.387423517530629E-002
 -1.392875955868696E-002 -1.391186566369354E-002 -1.382808636669970E-002
 -1.392922176804762E-002 -1.399890557474905E-002 -1.395800969660655E-002
 -1.384652824832583E-002 -1.393354357640388E-002 -1.383015033969298E-002
 -1.380994211528623E-002 -1.400221713058417E-002 -1.388649476098201E-002
 -1.383266258032891E-002 -1.391239596808844E-002 -1.386009668949673E-002
 -1.383689330562956E-002 -1.377705176667563E-002 -1.395980687289619E-002
 -1.390930850188710E-002 -1.381076436892904E-002 -1.396512455877110E-002
 -1.384896588980131E-002 -1.381401310560844E-002 -1.390777687641375E-002
 -1.386828868386726E-002 -1.382839732880077E-002 -1.393684942556307E-002
 -1.393933505230002E-002 -1.388151967494199E-002 -1.391953769805318E-002
 -1.400692531905233E-002 -1.392739288431693E-002 -1.387233244614464E-002
 -1.392984745727604E-002 -1.395500493960412E-002 -1.386315315939901E-002
 -1.390835119341450E-002 -1.369128223306319E-002 -1.385849652978341E-002
 -1.383139636724253E-002 -1.382778190788405E-002 -1.383282032015669E-002
  0.000000000000000E+000
   1.02808482322349       0.000000000000000E+000
   1.02988872247355       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
