         180           8
   3.48734005470060        3.25646154875802        3.12406979853167     
   2.95327080180469        2.77767352415974        2.61061188890025     
   2.42095448109728        2.21062261751468     
  -16.5123391149583       -16.2447613074372       -15.9582389155827     
  -15.6533826793732       -15.2406399933770       -14.8188668734104     
  -14.4318258975834       -13.9894063139496     
  1.881602861949193E-003  0.000000000000000E+000
  0.988911161520631       0.000000000000000E+000
  0.991718204717405       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
